Indirect controlof quantum system via accessor: pure coherent controlw ithout system excitation
author: H C Fu [1 SchoolofP hysics Science and Technology , Shenzhen U niversity , Shenzhen 518060 , P.R .C hina] SchoolofP hysics Science and Technology Shenzhen U niversity 518060 Shenzhen P.R .C hina; Uid Ong [2 Institute ofT heoreticalP hysics , C hinese A cadem y ofSciences , B eijing 100080, P.R .C hina 3 D epartm ent ofm athem atics ,] Institute ofT heoreticalP hysics C hinese A cadem y ofScien; X F Liu; C P Sun [2 Institute ofT heoreticalP hysics , C hinese A cadem y ofSciences , B eijing 100080, P.R .C hina 3 D epartm ent ofm athem atics ,] Institute ofT heoreticalP hysics C hinese A cadem y ofScien; [Peking U niversity , B eijing 100871 , P.R .C hina] Peking U niversity B eijing 100871 P.R .C hina
source date: 13 Nov 2008
edition published: 13 Nov 2008
language: en