On the Amplitudes of Superhumps
author: J Smak jis@camk.edu.pl [Nicolaus Copernicus Astronomical Center , Polish Academy of Sciences ul. Bartycka 18 , 00-716 Warszawa , Poland] Nicolaus Copernicus Astronomical Center Polish Academy of Scien
source date: 16 Jan 2009
edition published: 16 Jan 2009
language: en

Amplitudes of bolometric light curves produced by 2D and 3D SPH simulations are used to determine the corresponding visual amplitudes. They turn out to be 10 times lower than typical amplitudes of superhumps. This means a major failure of the tidal model of superhumps.