Charge Calibration of the ANTARES high energy neutrino telescope
author: Bruny Baret [y Laboratoire AstroParticle and Cosmology 10 , rue A. Domon et L. Duquet , 75205 Paris Cedex 13 , France.] rue A. Domon et L. Duquet Laboratoire AstroParticle and Cosmology 10 75205 Paris
source date: 2 Dec 2009
edition published: 2 Dec 2009
language: en

ANTARES is a deep-sea, large volume mediterranean neutrino telescope installed off the Coast of Toulon, France. It is taking data in its complete configuration since May 2008 with nearly 900 photomultipliers installed on 12 lines. It is today the largest high energy neutrino telescope of the northern hemisphere. The charge calibration and threshold tuning of the photomultipliers and their associated front-end electronics is of primary importance. It indeed enables to translate signal amplitudes into number of photo-electrons which is the relevant information for track and energy reconstruction. It has therefore a strong impact on physics analysis. We will present the performances of the front-end chip, so-called ARS, including the waveform mode of aquisition. The in-laboratory as well as regularly performed in situ calibrations will be presented together with related studies like the time evolution of the gain of photomultipliers